specifications

features/settings

Frequency options | 4 - 8 - 12 - 18 - 25 kHz + shifts ( X35 coils)
| 15 - 30 - 50 or 80 kHz + shifts (depending HF coils)
Sensitivity | 99 levels
Transmitter Power | 3 levels ( X35 coils)
Reactivity | 6 levels
Sound Curve | 8 levels
Iron Volume | 6 levels
Multi Tones | 1, 2, 3, 4, 5, Pitch and Full Tones + EXPERT
Ground balance | Tracking, Pumping, Manual, Wet beach
Multi-Notch | Yes, with adjustable window width
Modes | Motion/None Motion
Non motion Pinpoint | Yes, audio and visual
Discrimination | Audio and visual
Iron discrimination range | 164 levels
Non-iron discrimination range | 90 levels
Factory programmes | x10 + 8 customisable programs

General Features

Audio volume | Yes on wireless headphones
Display screen | 8192 pixels
Backlighting | Yes, very low power consumption
Software updates | Yes, via USB
Wireless headphones | 3 models WS4 - WS5 - WSAudio, weatherproof
Coil / Coil cover | DD - 6 meters - 20 feet Waterproof - Wireless
Belt-mounted remote control case | Yes
Headphone storage case | Yes
Stem | Fully telescopic, S-shaped
Batteries | Lithium ion polymer
Remote control battery life | 19 hours
Wireless headphones battery life | 22 hours
Coil battery life | 15 hours on average depending frequency
Charging time | Coil: 2h15 , Headphones/Remote control: 3h00
Total weight with batteries | 975g (875g without remote control)
Total weight of stem | 455 g
Weight of remote control with battery | 100 g
Weight of headphones with battery | 86 g (WS4), 255 g (WS5)
Weight of coil | 345 g with coil cover
Length of folded stem | 58 cm
Length of deployed stem | 130 cm
Waterproof coil | Yes, but needs the optional antenna to use with the coil submerged
Warranty | 5 year parts and labour. Batteries, chargers & connectors have a 2 year warranty.

LONGTIME® LONGIVITY LABEL

Concerned about our planet and fighting against planned obsolescence, XP Metal Detectors have obtained the Long Time label. The first European label identifying and promoting products that are designed to last. XP Metal Detectors guarantee their metal detectors for 5 years and offer repairs and spare parts for a minimum of 10 years. DEUSII®, DEUS®, FMF® ORX®, WS6 Master have all obtained the label certification. Visit www.xpmetaldetectors.com/en/page/who-we-are.php to learn more.

Visit www.xpmetaldetectors.com for more information, download the user guide for tips and technical information. Many more accessories are available. Visit an XP dealer or the XP website to see the full range and understand all the pack you can order. DEUSII®, DEUS®, FMF® ORX®, are trademarks of XP Metal Detectors. The visuals and graphics provided are solely intended for demonstrative purposes, and the actual product may differ from the depicted configurations.
Photo credits: Xplorer® - Thomas Conte - Freepik.com / Creation and realisation: Thomas Conte - info@thomas-conte.fr / Print at: Cazaux Imprimerie - 31600 Muret - France

Take your metal detecting to the next level

fast and deep
Fully Wireless
Multiple search modes for all terrain
Lightweight and ergonomic
Built to last

XP DEUS Never
Misses a Target

Trusted XP fast  wireless technology

ALL TERRAIN ALL CONDITIONS

Its versatility and adaptability make it an indispensable tool, whether you’re eXPloring the depths of a forest or combing the shores of a beach

15 kHz

17 kHz

12 kHz

18  programs

8 kHz

With its 18 programs, the DEUS is incredibly versatile and can adapt to any type of soil.  10 factory programs + 8 custom.

4 kHz

4 / 8 / 12 / 15 / 17 kHz
Large to medium sized targets

Experience the world’s lightest high-end metal detector. Detect for longer periods of time with ease, without sacrificing performance.

FROM 750G - (1.7 lbs)

reactivity

It’s lightning-fast reactivity gives you clear information about your target, helping you to make the right decision, every time.

5 COMPATIBLE
COILS

R0 - R1
No sound

35 frequencies

R2 - R3
Short sound

Free XP upgrade

R4 - R5
Full sound

With many frequencies to choose from, ranging from 3.7 to 81 kHz,  you can fine tune your detector to find a variety of targets at different depths. Whether you’re searching for large, deep treasures or smaller, shallow items, the XP DEUS has the perfect frequency to suit your needs.

Accessories

30 kHz

55 kHz

81 kHz

30 kHz
Medium to small targets

55 kHz / 80 kHz
Small to miniature targets

Versatility
Performance
18 programs including 10 factory programs and 8 customisable user programs

remote
control

WS Audio headphones

WS4 headphones

WS5 Headphones

HF Coils
15 - 30 - 50 or 80 kHz + shifts

Battery level of coil and remote control

Target conductivity, from O to 99

Choose your own display
Horseshoe or XY screen, ...

Frequency used

Access to MENU DISCRI - SENS - FREQ ...

ON/OFF Access to menu OPTION
Configuration / Programs / Coils / Pinpointer XP

Decrease values - Change program

Target conductivity

The ground mineralisation index
(phase measured constantly for information)

Mineralisation strength

The actual level of ground effect corrections (phase adjustment underway)

Access to G.B. (Ground Balance) Manual / Pumping / Beach /Tracking

lncrease values Change program

Non-motion mode (Pinpoint)
- Ground Grab prog. 10

X35 Coils
4 - 8 - 12 - 18 - 25 kHz + shifts

Pinpointer MI-6 connected