specifications

features/settings

Operating frequencies | Fast and simultaneous Multi Frequency or 49 single frequencies from 4 to 45 kHz.
Sensitivity | 99 levels
Sound type | Different sound options: PWM, SQUARE, High Square.
Audio Volume | 10 levels for each audio output
Reactivity | 9 levels (0/0.5/1/1.5/2/2.5/3/4/5)
Audio Response | 8 levels
Iron Volume | 10 levels
Multi Tones | 1, 2, 3, 4, 5, Pitch and Full Tones + EXPERT modes
Ground balance | Tracking, Grab, Manual (Mono-frequency program)
Multi-Notch | Yes, with adjustable window width
Non-motion mode - Pinpoint | Yes, with and without Autotune - Audio and visual
Discrimination | Audio and visual / ferrous bottle cap rejection on 5 levels / Silencer
Threshold | Adjustable Threshold, adjustable Audio frequency
Equalizer | 4 configurable bands
Programs | 12 factory programs + 12 users
Backlight | 20 adjustable levels, very low power consumption

General Features

Display screen | 8192 pixels
Software updates | Yes, by USB/Internet connection
Wireless Headphones (optional) | WS6 (rainproof) - WSAII (rainproof) - WSAII XL (waterproof IP 68-1m / 3 ft)
Bone conduction headphones | Waterproof IP68 - 20m - 66 ft (optional)
Wireless coil optional / Coil cover | DD 22.5cm-9’’ - 28 cm-11’’ - 34x28cm-13’’x11’’ (fully waterproof 20m - 66 ft) / Yes
Hip mount remote control case | Yes
Headphone storage case | Yes (WS6, WSA II)
Stem | Fully telescopic, S-shaped
Batteries / Battery level indicator | Remote - Coil: 700 mAh - Headphones: 320 mAh / Yes: Remote - Headphones - Coil - MI-6
Wireless Remote Control battery life | ~ 15 to 30H depending on audio output activated
Wireless Headphone battery life | ~ 15H WSAII/WS6
Wireless Coil battery life | 8H to 20H depending on programs and frequencies
Charging time | ~3 h
Total detector weight with batteries | See product page for details on each version
Stem weight | 370 g (S-Telescopic) - 305 g (S-Telescopic lite)
Remote weight with battery | 150 g
Headphone weight with battery | WS6: 82 g - WSA II: 72 g - WSA II XL: 250 g
Coil weight | 22.5cm- 9’’: 345 g - 28 cm-11’: 470 g - 34x28cm-13’’x11’’: 570 g
Length of folded stem | 58 cm
Length of extended stem | 130 cm
Waterproof coil | IP 68 - 20m - 66 ft, *optional antenna required when the coil is submerged
Warranty | Five year parts and labour. Batteries, chargers and connectors have a two year warranty

LONGTIME® LONGIVITY LABEL

Concerned about our planet and fighting against planned obsolescence, XP Metal Detectors have obtained the Long Time label. The first European label identifying and promoting products that are designed to last. XP Metal Detectors guarantee their metal detectors for 5 years and offer repairs and spare parts for a minimum of 10 years. DEUSII®, DEUS®, FMF® ORX®, WS6 Master have all obtained the label certification. Visit www.xpmetaldetectors.com/en/page/who-we-are.php to learn more.

Visit www.xpmetaldetectors.com for more information, download the user guide for tips and technical information. Many more accessories are available. Visit an XP dealer or the XP website to see the full range and understand all the pack you can order. DEUSII®, DEUS®, FMF® ORX®, are trademarks of XP Metal Detectors. The visuals and graphics provided are solely intended for demonstrative purposes, and the actual product may differ from the depicted configurations.
Photo credits: Xplorer® - Thomas Conte - Freepik.com / Creation and realisation: Thomas Conte - info@thomas-conte.fr / Print at: Cazaux Imprimerie - 31600 Muret - France

eXPlore like never before

High Pertformance
FMF® Fast Multi Frequency
excels On all terrains
Waterproof up to 20 METERS - (66ft) deep
Rich Audio options:  four band equalizer, multiple audio Options
ACCURATE TARGET ID AT DEPTH
Fully Wireless
Lightweight and ergonomic
Built to last

Trusted XP fast  wireless technology

ALL TERRAIN ALL CONDITIONS

Its versatility and adaptability make it an indispensable tool, whether you’re eXPloring the depths of a forest or combing the shores of a beach

All Terrain

The DEUS II is the epitome of versatility. Equipped with the FMF® technology, it is equally at home on any terrain. This state-of-the-art metal detector has been designed to provide unparalleled performance, no matter where you take it.  With the DEUS II, you can effortlessly explore the great outdoors, uncovering hidden treasures at ease. In addition to its exceptional performance on land and beaches (even wet sand), the XP DEUS II Metal Detector is also a proficient diving companion.

24 programs

12 factory programs + 12 user / customizable programs! Designed to excel in any conditions.

FROM 750G - (1.7 lbs)

Experience the world’s lightest high-end metal detector. Detect for longer periods of time with ease, without sacrificing performance.

Choose simultaneous multi-frequency or the 49 frequencies of your choice, from 4 to 45 kHz.

WATERPROOF
UP TO 20M - IP 68

The XP DEUS II is a proficient diving companion, capable of submerging up to 20 meters (66 feet) deep.

rich audio options

With a large variety of sound types, you can fully customise your audio experience. Its 4-band equalizer ensures clear, precise signals.

Free USB UPDATES

ACCURATE TARGET ID.

The above graphic Illustrates the sensitivity and the iron discrimination capability depending on frequency and the advantage of Fast Multi Frequency programs covering a large spectrum of targets. This is only a basic schematic which can vary depending the programs and real terrain conditions.

Accessories

WS6 Headphones

remote
control

Shockproof
Detachable
Hipmounted
Waterproof up to 20m/66ft (IP68)

BH-01
Bone conduction
headphones

WSA II Headphones

World’s first bone conduction headphones for metal detecting
Waterproof up to 20m deep (IP68)
Freeing up your ears
Suitable for use in noisy environments

WSA II XL  Headphones

Scale of target conductivity

Ferrous/Non ferrous display

Clock and battery levels alternate display with Ground level

Access to OPTION
Configuratlon/ Program...

Change program
Decrease values

Pinpoint (non-motion mode).
Long press : GRAB (ground capture).

SHOCKPROOF
REMOTE CONTROL

Ground mineralization (Phase measured)

Ground effect correction

Access GROUND SETTING (G.B)
Long press : Shortcut to Automatic Freq. Scan

Long press :
Shorcut Full screen T.ID

Change program
lncrease values

MENU.
Long press : send the T.ID to the smartphone with Go Terrain

Pinpointer MI-6 connected

FMF® Coils 34/28 - 28 - 22