specifications

features/settings

Frequency Choices | 22cm / 9’’ HF COIL : 15 / 28 / 54 kHz + shift Elliptical HF COIL : 15 / 28 / 80 kHz + shift X35 coil : 4 / 8 / 12 / 18 / 25 kHz + shift
Sensitivity | 99 levels
Reactivity | 4 levels
Iron tone | ON / OFF
Ground balance | Automatic mode / Manual mode
Discrimination | IAR ( Iron Amplitude Rejection) + Normal
Target ID | Audio & visual
Factory programs | x 4 + 2 customisable programs
Audio Volume | Yes on wired headphones and wireless headphones

General Features

Display screen | 8192 pixels
Backlighting | Yes, very low power consumption
Wireless headphones | Yes, WS AUDIO in option, rain proof
Coil / Coil cover | DD, waterproof - wireless / Yes
Headphone storage case | Yes with WSA headphones (optional)
Batteries / Battery level indicator | Lithium polymer
Remote control battery life | 19 hours
Wireless WSA battery life | 15 hours
Coil life | 20 to 28 hours
Charging time | Coils / WSA / Remote control : 3 H
Total weight with batteries | 870 g (770g without remote control)
Total weight of stem | 390 g
Weight of remote control with batteries | 100 g
Weight of headphones with battery | 66 g (WSA)
Weight of coil | 345 g with coil cover (22cm / 9 ‘’ Coil)
Length of folded stem | 58 cm
Length of deployed stem | 130 cm
Waterproof coil | Yes, but an optional antenna is required for use when the coil is submerged
Warranty | 5 year parts and labour, battery 2 years

S-Telescopic Lite Stem

• The ORX S-Telescopic Lite stem weighs only 320g • Telescopic for better / fast storage
• Ergonomic for better comfort • Quickly adjustable to search any terrain

The patented XP S-shaped stem has been designed to provide a natural forward offset of the coil, keeping it away from the user’s feet. Unlike a straight stem which requires the user to lift the stem slightly while sweeping the ground in order to avoid hitting their feet, the S-shaped stem spares the user from this additional effort. This unique design feature makes XP detectors effortless and comfortable to use for extended periods, reducing fatigue and allowing you to focus on discovering treasures!

LONGTIME® LONGIVITY LABEL

Concerned about our planet and fighting against planned obsolescence, XP Metal Detectors have obtained the Long Time label. The first European label identifying and promoting products that are designed to last. XP Metal Detectors guarantee their metal detectors for 5 years and offer repairs and spare parts for a minimum of 10 years. DEUSII®, DEUS®, FMF® ORX®, WS6 Master have all obtained the label certification. Visit www.xpmetaldetectors.com/en/page/who-we-are.php to learn more.

Visit www.xpmetaldetectors.com for more information, download the user guide for tips and technical information. Many more accessories are available. Visit an XP dealer or the XP website to see the full range and understand all the pack you can order. DEUSII®, DEUS®, FMF® ORX®, are trademarks of XP Metal Detectors. The visuals and graphics provided are solely intended for demonstrative purposes, and the actual product may differ from the depicted configurations.
Photo credits: Xplorer® - Thomas Conte - Freepik.com / Creation and realisation: Thomas Conte - info@thomas-conte.fr / Print at: Cazaux Imprimerie - 31600 Muret - France

FIND MORE THAN GOLD

High frequencies up to 81kHz
Multiple search modes
Fully Wireless
Weather-resistant design
Lightweight and ergonomic
Built to last

Catch the tiniest
gold particles

Trusted XP fast  wireless technology

All
Terrain

17 kHz

4 factory programs
2 GOLD - 2 COINS
+ 2 CUSTOM

15 kHz

8 kHz

12 kHz

4 kHz

FROM 750G - (1.7 lbs)

Experience the world’s lightest high-end metal detector. Detect for longer periods of time with ease, without sacrificing performance.

4 / 8 / 12 / 15 / 17 kHz
Large to medium sized targets

GOLD PROSPECTING

Experience the ultimate in gold prospecting with XP Gold Prospecting range, featuring high-quality pans, classifiers, batea, and accessories. Among the innovation the kits boast: defragmenter, Snake Skin, double sieving action in one go, and more!

5 COMPATIBLE
COILS

Gold
PAN KIT

Gold
batea

21 frequencies
13 to 81kHz

Lithium Battery
12 h Battery life

Jean-Luc Billard

With a frequency range that goes up to 81 kHz, XP ORX is the ultimate tool for finding the smallest gold particles. Whether you’re a seasoned gold hunter or a beginner, XP ORX has the precision and sensitivity you need to make your next big discovery. Choose XP ORX and take your gold detecting to the next level.

Accessories

30 kHz

30 kHz
Medium to small targets

55 kHz

81 kHz

WS Audio headphones

55 kHz / 80 kHz
Small to miniature targets

HF Coils
22cm / 9’’ HF COIL : 15 / 28 / 54 kHz + shift
Elliptical HF COIL : 15 / 28 / 80 kHz + shift

The remote control comes with 4 factory programs and 2 customisable user programs. Whether you’re searching for gold, coins, relics, jewelry, or any other valuable items, XP ORX has the power and versatility you need.

Remote control

X35 Coils
4 - 8 - 12 - 18 - 25 kHz + shifts

Program &  frequency used

Mineralisation strength

Ground balance’s settings

Access to Options
Press 2 sec: ON / OFF

Access to MENU Press 2 sec: GO TERRAIN

Capture of  the ground effects Press 2 sec: PINPOINT

Battery level  (displays alternately)
Coil / Remote control / MI-6

Ground mineralisation

Pinpointer MI-6 connected

Change programs
Press 2 sec: SALT mode

Adjust the ground balance and settings values