specifications

features/settings

Operating frequencies | Fast and simultaneous Multi Frequency or 49 single frequencies from 4 to 45 kHz.
Sensitivity | 99 levels
Sound type | Different sound options: PWM, SQUARE, High Square.
Audio Volume | 10 levels for each audio output
Reactivity | 9 levels
Audio Response | 8 levels
Iron Volume | 6 levels
Multi Tones | 1, 2, 3, 4, 5, Pitch and Full Tones 1 and 2 + EXPERT modes
Multi Notchs | Yes
Ground balance | Tracking, Grab, Manual
Non-motion mode - Pinpoint | Yes
Discrimination | Audio and visual/ferrous bottle cap rejection on 5 levels/Silencer
Threshold | Threshold and Audio frequency adjustable
Equalizer | 4 Bands configurable
Programs | 12 factory programs + 12 users

General Features

Display screen | 4096 pixels
Software updates | Yes, by USB
Wireless Headphones optional | WS6 (rainproof) - WSAII (rainproof) - WSAII XL (IP 68-1m)
Wireless coil optional | DD 22.5cm-9’’/28 cm-11’’/34x28cm-13’’x11’’ (fully waterproof 20m - 66 ft)
Coil cover | Yes
Headphone storage case | Yes (WS6, WSA II)
Stem | Fully telescopic, S-shaped (S-Telescopic lite)
Batteries | Remote/Coil: 700 mAh - Headphones: 365 mAh
Battery level indicator | Yes: Remote/Headphones/Coil/MI-6
Wireless Headphone battery life | ~ 14H WSAII/WS6
Wireless Coil battery life | 8H to 20H depending on programs and frequencies
Car charger | Optional
Charge time | ~3 h
Total detector weight with batteries | See product page for details on each version
Stem weight | 370 g (S-Telescopic) - 305 g (S-Telescopic lite)
Headphone weight with battery | WS6: 82 g - WSA II: 72 g - WSA II XL: 250 g
Coil weight | 22.5cm- 9’’: 345 g - 28 cm-11’: 470 g - 34x28cm-13’’x11’’: 570 g
Length of folded stem | 58 cm
Length of extended stem | 130 cm
Waterproof coil | IP 68 - 20m - 66 ft, *optional antenna required when the coil is submerged
Warranty | Five year parts and labour. Batteries, chargers and connectors have a two year warranty

LONGTIME® LONGIVITY LABEL

Concerned about our planet and fighting against planned obsolescence, XP Metal Detectors have obtained the Long Time label. The first European label identifying and promoting products that are designed to last. XP Metal Detectors guarantee their metal detectors for 5 years and offer repairs and spare parts for a minimum of 10 years. DEUSII®, DEUS®, FMF® ORX®, WS6 Master have all obtained the label certification. Visit www.xpmetaldetectors.com/en/page/who-we-are.php to learn more.

Visit www.xpmetaldetectors.com for more information, download the user guide for tips and technical information. Many more accessories are available. Visit an XP dealer or the XP website to see the full range and understand all the pack you can order. DEUSII®, DEUS®, FMF® ORX®, are trademarks of XP Metal Detectors. The visuals and graphics provided are solely intended for demonstrative purposes, and the actual product may differ from the depicted configurations.
Photo credits: Xplorer® - Thomas Conte - Freepik.com / Creation and realisation: Thomas Conte - info@thomas-conte.fr / Print at: Cazaux Imprimerie - 31600 Muret - France

ONE MODULE FOR ALL TERRAIN,
lightest DEUS II configuration
Agile, powerful, performant
FMF® Fast Multi Frequency
ACCURATE TARGET ID AT DEPTH
Fully Wireless
Rich Audio options
Built to last

Trusted XP fast  wireless technology

FROM 750G - (1.7 lbs)

Experience the world’s lightest high-end metal detector. Detect for longer periods of time with ease, without sacrificing performance.

All Terrain

With the WS6 Master, explore the great outdoors with ease and uncover hidden treasures effortlessly, thanks to the incredible adaptability and versatility. You can trust that it will deliver exceptional performance and precision on any terrain.

full screen
accurate t.ID

This compact WS6 module is equipped with a full screen mode that displays the target ID number. It’s delivering crystal-clear visuals for easy identification of targets.

rich audio options

With a large variety of sound types, you can fully customise your audio experience. Its 4-band equalizer ensures clear, precise signals.

Choose simultaneous multi-frequency or the 49 frequencies of your choice, from 4 to 45 kHz.

graphic display

Rainproof module

free usb updates

The above graphic Illustrates the sensitivity and the iron discrimination capability depending on frequency and the advantage of Fast Multi Frequency programs covering a large spectrum of targets. This is only a basic schematic which can vary depending the programs and real terrain conditions.

Accessories

Access every
Deus II setting

WSA II Headphones

WSA II XL Headphones

Pinpointer MI-6 connected

WS6 Module

Wide graphic screen
Rainproof module
Access all 24 DEUS II programs including 12 factory and 12 customisable user programs

Decrease values.
Long press from main screen: SHORTCUT to VOLUME

Increase values
Long press from main screen:
SHORTCUT GO TERRAIN PUSH

OPTIONS: Volume/Config. In Option long press: EXPERT Mode
ln Menu: Back
Long press from main screen :
SHORTCUT to GRAB

MENU : DISCRI/SENS/ ...
• Long press from menus:     EXPERT mode
• Long press from main screen:      PINPOINT MODE

F / NF (ferrous / non-ferrous) and target strength

FMF® Coils 34/28 - 28 - 22

XP Wristband