specifications

features/settings

Sensitivity | 99 levels
Discrimination | IAR on 5 levels
Threshold | 20 levels
Reactivity | 3 levels
Auto Tune | 3 levels
Frequency Shift | 14 bands Manu/Auto
Audio Response | 4 levels
Ground balance | Grab or Manual
Equalizer | 4 configurable bands
Programs | 1 factory + 2 user programs
Display | Dynamic bar graphic

General Features

Technology | Simultaneous Fast Multiple Frequency (FMF®)
Detecting Type | Non-Motion with adjustable Autotune
Wireless Headphones optional | WS6 (rainproof) - WSAII (rainproof) - WSAII XL (IP 68-1m)
Case | included - rain and shock proof
Battery type | Li-ion 18650 x1 - 11 Watts/hour - 45g
Battery life | > 10 hours
Charging time | ~ 4 hours
Operating T° | 0 to + 40°C
Max ambient T° during charging | 0 to + 40°C
Charging Cable | USB type C
Lenght assembled | 1.20 m (3.94 ft)
Weight (Xtrem Hunter + remote) | 2.9 kg (6.4 lb)
Weight (Xtrem Hunter in its XP case) | 5.8 kg (12,8 lb)
Weight (XP Case) | 2.7 kg (6 lb)
XP case size | 725 x 480 x 170 mm (28’ x 18,9’x 6,7’)
XP Backpack 280 | Optional
Warranty | Five years parts and labour. Batteries and connectors, two-year warranty
Patents | US 7940049 B2 - EP 1990658 B1 and patents pending

LONGTIME® LONGIVITY LABEL

Concerned about our planet and fighting against planned obsolescence, XP Metal Detectors have obtained the Long Time label. The first European label identifying and promoting products that are designed to last. XP Metal Detectors guarantee their metal detectors for 5 years and offer repairs and spare parts for a minimum of 10 years. DEUSII®, DEUS®, FMF® ORX®, WS6 Master have all obtained the label certification. Visit www.xpmetaldetectors.com/en/page/who-we-are.php to learn more.

Visit www.xpmetaldetectors.com for more information, download the user guide for tips and technical information. Many more accessories are available. Visit an XP dealer or the XP website to see the full range and understand all the pack you can order. DEUSII®, DEUS®, FMF® ORX®, are trademarks of XP Metal Detectors. The visuals and graphics provided are solely intended for demonstrative purposes, and the actual product may differ from the depicted configurations.
Photo credits: Xplorer® - Thomas Conte - Freepik.com / Creation and realisation: Thomas Conte - info@thomas-conte.fr / Print at: Cazaux Imprimerie - 31600 Muret - France

REVEALING
THE DEEPEST
FINDS

ACCURATE TARGET AT DEPTH OF UP TO 5 METERS (17 feet)
FMF® Fast Multi Frequency
WIRELESS CONVENIENCE SEAMLESS COMPATIBILITY WITH THE DEUS II WIRELESS ECOSYSTEM
EASY TO USE
EASY TO TRANSPORT
WATERPROOF CONSTRUCTION
BUILT TO LAST

Trusted XP fast  wireless technology

Only 2.9 kg

Experience the world’s lightest high-end metal detector. Detect for longer periods of time with ease, without sacrificing performance.

XTREM  HUNTER

The XTREM HUNTER is the ultimate accessory for the DEUS II. New standards in the world of deep seeking metal detectors, it delivers unmatched performance and stability through its unique ability to limit ground effects. The XTREM HUNTER will be your reliable and robust companion for uncovering targets such as, large relics and various underground objects. The XTREM HUNTER is ideal for archaeologists, building professionals and passionate.

ALL TERRAIN ALL CONDITIONS

Its versatility and adaptability make it an indispensable tool, whether you’re eXPloring the depths of a forest or combing the shores of a beach

3 programs

1 factory programs
+ 2 customizable programs

• First deep-seeking
multifrequency detector
• Minimal ground noise
• Moderate-sized
ferrous discrimination

Free XP UPDATES

remote
control

Shockproof
Detachable
Waterproof up to 20m/66ft (IP68)

COMPATIBLE WITH

Accessories

When you pair up the DEUS II, it automatically switches to a dedicated interface with settings optimised for wide and deep target detection.

Signal Duration. It can help you estimate the target’s size.

Play / Pause indicator.
The main interface continuously displays the signal of the last 4 seconds. You can freeze it by pressing the Play / Pause key

Access to OPTION

Signal strength.
It can help you estimate the target’s depth.

Access to MENU - Long press: Marks your location on the Go Terrain smartphone app.

WS6 Headphones

WSA II Headphones

Play / Pause

SHOCKPROOF
REMOTE CONTROL

Access to G.B
Long press: shortcut FREQ SCAN (Noise cancel)

Change Program

Retune the Threshold
Long press: Ground Balance

WSA II XL  Headphones

unparalleled performance

BH-01
Bone conduction
headphones

Optional

Included

Conventional detectors are able to detect small targets as well as large metal masses at significant depths. However, they are affected by small targets near the surface or by ground effects and it is difficult to distinguish between a small surface target and a larger target at depth.
The XTREM HUNTER is highly insensitive to small surface targets. It has the capability to penetrate the top layers of the ground to easily detect through them.

Easy to transport